R. A. Briere Tracking with Helium 3

’

&

       $

       %

Outline

Introduction • B-Factory Tracking • Helium-Based Gases

Comparison of Ar-C_2H_6 and He-C_3H_8 • CLEO Drift Chamber (DR2) • Calibration • Tracking Performance • dE/dx Performance

Overview of New Chambers • BaBar • Belle • CLEOIII

Conclusion

Heavy Flavors ’97 Santa Barbara