R. A. Briere Tracking with Helium 29

’

&

       $

       %

Conclusion

Helium-Based Gas: • 10 years of studies • He-C_3H_8 works very well for CLEOII.5 • Improves things in addition to multiple scattering. • Lower Lorentz-angle is quite important.

B-Factory Drift Chambers: • Many similarities • Many differences • Some distinctive endplate/cylinder constructions • Range of radial extent • Wide variety of cathode choices • Different stereo layer choices • Plan to use 3 different gases

Wait and see real performances...

Heavy Flavors ’97 Santa Barbara