Detector Upgrades – DO̸:

• Installation of a solenoid magnet.

• Complete replacement of the central tracking systems.

{ Scintillating fiber tracker { Addition of a silicon vertex detector (3-D Track) • New data aquisition system, trigger system, Frontend Elec. • Upgrades to the muon system (Shielding and Trig. Scin.)