Top Mass (cont.):

tt̄ Sample:

• The distribution of tt̄ events with more than 4 jets can help us understand the effects of hard gluon radiation.

Best sample for mass measurement may be the double tagged sample. The signal-to-noise in this sample will be probably better than 10:1 and association of partons is easier.

Overall Error on Top Mass

2-3 GeV/c2 (1.5 %)