Top Mass (cont.):

Statistical Uncertainty:

• Scale Uncertainty by 1/ √ N. • Statistical Uncertainty:

≈ 1 GeV/c2

• This is probably somewhat conservative because the S/N in the Run II samples will be better than in Run I because of the improved b-tagging efficiencies. Especially with the double b-tagged events.