Top Mass Measurement

• Current Measurements:

{ DO̸ Mass: 173.3 ± 5.6 (stat) ± 6.2 sys { CDF Mass: 176.8 ± 4.4 (stat) ± 4.8 sys • The top mass is a parameter of the Standard Model which plays an important role in the calculation of EWK observables. An accurate measure of M_t along with an accurate measure of M_W can limit the Higgs mass.

• Best Measurements use Lepton + 4 Jet final States.

(I will only consider this case) • Mass Measurements have been performed with the dilepton and all hadronic final states.

How does the measurement of Mt improve?