Elastic J/ψ - Signals

event selection

H1 94+95 H1 94+95

M_μ+_μ− [GeV ] M_e+_e− [GeV ] • J/Ψ tagged from its decay into μ^+μ^− or e^+e^− • ⃗p_{μ,e} measured in central drift chamber or BEMC (J/Ψ → e^+e^−) • muons identified in LAr and/or muon detector • electrons identified in LAr or BEMC (1994) • z > 0.9 to select diffractive contibutions • forward cuts against proton dissociation

no signal (above noise) in forward detectors: proton tagger (+24 m), forward muon system and forward part of LAr • proton dissociation cross section measured separately

Christoph Grab, 7th Int. Symp. on Heavy Flavour Physics, Santa Barbara, July 1997 21