Hadronic Branching Ratios

Summary of Results

Brancing Ratio (10^{−4}) Mode CLEO Meas Prediction

3π^±η 3.4^{+0.6}_{−0.5} ± 0.6 0.012 Pich 87 π^±2π^0η 1.4±0.6 ± 0.3 0.012 Pich 87

π^±η^′ <0.74 (90%CL) π^±π^0η^′ <0.80 (90%CL)

f1π^± 5.8^{+1.4}_{−1.3} ± 1.8 2.9 Li 97 a^±_1 η→π^±ρ^0η <3.9 (90%CL) 2.93 Li 97

3π^±3π^0 2.85±0.56 ± 0.51 3π^±3π^0(I=1) 1.41±0.76 ≥2.5 Eidelman π^±2π^0ω 1.89^{+0.74}_{−0.67} ± 0.40

H. Evans