Hadronic Branching Ratios

Structure in the Decays:

Expect 75% f1 → a0(980)π → ηππ

f1 Saturation? f^1π^±→3π^±η 3π^±η = 0.55 ± 0.14

(3π^±η Decays outside f1 Peak)

Excess of a^±_1 (1260)η→π^±ρ^0η < 2σ

H. Evans