Structure of the Hadronic Current

DELPHI: Dalitz Plots using Fit Params – No a^′_1 Q^2=3.2–2.3 2.3–2.0 2.0–1.7

Q^2=1.7–1.4 1.4–1.1 1.1–0.8

√ s1

√ s2

Key:

• solid = IMR (resonant) • dotted = KS • shaded = τ Bgrd

H. Evans