Structure of the Hadronic Current

Comparison of 2π Data with Models

Models: Kühn,Santamaria(KS) vs Gounaris,Sakurai(GS) • Include ρ^±(770,1450,1700) & ρ − ω Interfer. • Different Treatments of Breit-Wigner Res’s • Fit for various ρ-param’s & fractions

ALEPH τ^±→π^±π^0ντ

Agreement Quite Good

H. Evans