Structure of the Hadronic Current

Vector Spectral Functions

ALEPH Measures Vector Spectral Func’s for Excl. Reconstructed Decays

• τ^± → ντ + π^±π^0 ; π^±3π^0, 3π^±π^0 ; 5π^±π^0 • Sum with Corr’s for Bgrd & Unmeas Modes Unfold Meas → True s-Distrib’s

Disagreement around 2 GeV^2 from discrepancy in τ^±→3π^±π^0ντ vs σ(e^+e^−→4π)

H. Evans