B^+ decays with kaons

Decay B Theory Mode Experiment N_S N_B (10^−6) (10^−6) K+π0 CLEO II 8.7^∗ - < 16 5–10 K0π+ CLEO II 9.2^∗ - 23+11_−10 6–13 K+K0 CLEO II 0.6^∗ - < 21 0.6–2.4 K^∗+π0 CLEO II 4 1.9 ± 0.7 < 99 3–9 K^∗0π+ CLEO II 2 1.0 ± 0.6 < 41 4–10 K^∗+K0 0.–0.05 K^∗0K+ 0.3–1 K^∗+K^∗0 1 K+ρ0 CLEO II 1 3.8 ± 0.2 < 19 0.05–2 K0ρ+ CLEO II 0 0 < 48 0.1–0.4 K^∗+ρ0 ARGUS < 900 1–8 K^∗0ρ+ 8–13 K+η CLEO II 0 2.2 ± 0.4 < 8 0.3–5 K^∗+η CLEO II 0 0.5 ± 0.2 < 240 1–13 K+η^′ CLEO II 12.0^∗ - 78+29_−24 10–41 K^∗+η^′ CLEO II 0 0.3 ± 0.1 < 290 0.2–9 K+ω CLEO II 8.6^∗ - 12+7_−5 1.5–5 K^∗+ω CLEO II 0 0.9 ± 0.3 < 110 4–15 K+f0 CLEO I 0 0 < 80 K01 (1400)π+ ARGUS < 2600 K+1 (1400)ρ0 ARGUS < 780 K^∗2 (1430)0π+ ARGUS < 680 K^∗2 (1430)+ρ0 ARGUS 0 < 1500 K+ϕ CLEO II 0 0 < 12 2–16 K^∗+ϕ CLEO II 1 0 < 70 2–31 K+1 (1400)ϕ ARGUS < 1100 21 K^∗2 (1430)+ϕ ARGUS < 3400 0.7

∗ Maximum likelihood fit - N_S does not include any background