Present experimental knowledge and theoretical predictions

B^+ decays without kaons

Decay B Theory Mode Experiment NS NB (10^{−6}) (10^{−6})

π+π0 CLEO II 11.3∗ - < 20 6–20 ρ+π0 CLEO II 8 5.5 ± 1.2 < 77 13–39 ρ0π+ CLEO II 4 2.3 ± 0.3 < 43 0–15 ρ+ρ0 ARGUS < 1000 0–28

ηπ+ CLEO II 0 2.2 ± 0.4 < 8 2–6 ηρ+ 5–44

η′π+ CLEO II 1.4∗ - < 44 8–17 η′ρ+ 11–57

ωπ+ CLEO II 9.5^∗ - 12^{+7}_{−5} 0–15 ωρ+ 0–28

f0π+ CLEO I 1 0 < 140 f2π+ CLEO I 7 10.4 ± 4.7 < 240 a01π+ ARGUS < 900 a+1 π0 ARGUS < 1700 a+1 ρ0 ALEPH 0 < 170 a+2 ρ0 CLEO I 2 6.3 ± 3.6 < 720 a01ρ+ a+1 a01 ARGUS < 13000

∗ Maximum likelihood fit - NS does not include any background