Summary of rare-B decay measurements

ffl We are beginning to get real information on some modes but

errors are still substantial

ffl B→η^′K and B→η^′XS unexpectedly large, possibly requiring

new physics explanation for the latter.

ffl Still to come:

⋆ Add ∼ 50% additional data from CLEO 2.5 (SVX) ⋆ Finish likelihood analyses on more modes with η, K^∗, ϕ, ...

and study ratios of B’s ⋆ Look for direct CP violation by measuring asymmetries, for both inclusive and exclusive decays (needs a lot more data) ⋆ Fill in the holes in the tables - many modes still not done ⋆ Expect many more 2-3σ hints ⇒ 3-5σ signals